-18 -16 -14 -12 -10 -8

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

10^0

SN R (dB)

BER

Monte-Carlo N_t = 4 UB C= 10 N_t = 4 UB C= 6 N_t = 4 UB C= 4 N_t = 4 Monte-Carlo N_t = 10 UB C= 10 N_t = 10 UB C= 6 N_t = 10 UB C= 4 N_t = 10