-12 -11 -10 -9 -8 -7 -6

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

SN R (dB)

BER

Gauss. N_r = 100 Exact N_r = 100 Approx. N_r = 100 Gauss. N_r = 150 Exact N_r = 150 Approx N_r = 150 Gauss. N_r = 200 Exact N_r = 200 Approx. N_r = 200

0.7 dB 0.75 dB 0.8 dB